From 9177229ec032710501cbb099c2a3de098f2cb51f Mon Sep 17 00:00:00 2001
From: Petr Vaněk <arkamar@atlas.cz>
Date: Sat, 30 Apr 2016 23:44:43 +0000
Subject: Fix Underfull \hbox in the refsheet

The macro \\ should not be used when an empty line follows.
---
 doc/refsheet.tex | 5 ++---
 1 file changed, 2 insertions(+), 3 deletions(-)

(limited to 'doc/refsheet.tex')

diff --git a/doc/refsheet.tex b/doc/refsheet.tex
index 53b03c5..fbbd7a9 100644
--- a/doc/refsheet.tex
+++ b/doc/refsheet.tex
@@ -6,11 +6,10 @@
 
 
 {\Huge libzahl}
-\\
+\vspace{1em plus .2em minus .1em}
 
 Unless specified otherwise, all times are of type {\tt z\_t}.
-\\ \\
-
+\vspace{2em plus .4em minus .2em}
 
 \begin{tabular}{lll}
 \textbf{Initialisation}       & {}                         & {}                                                \\
-- 
cgit v1.2.3-70-g09d2

