From a36227cae9c9983faad42f98c3aa79c7a0d863a0 Mon Sep 17 00:00:00 2001
From: Mattias Andrée <maandree@kth.se>
Date: Wed, 11 May 2016 16:10:53 +0200
Subject: Work on the manual and zstr_length checks that the radix is valid
MIME-Version: 1.0
Content-Type: text/plain; charset=UTF-8
Content-Transfer-Encoding: 8bit

Signed-off-by: Mattias Andrée <maandree@kth.se>
---
 doc/get-started.tex | 5 ++++-
 1 file changed, 4 insertions(+), 1 deletion(-)

(limited to 'doc/get-started.tex')

diff --git a/doc/get-started.tex b/doc/get-started.tex
index 537b228..0b297ed 100644
--- a/doc/get-started.tex
+++ b/doc/get-started.tex
@@ -147,6 +147,9 @@ error code, you instead look at the return value.
        case ZERROR_NEGATIVE:
            fprintf(stderr, "Undefined (negative input)\verb|\|n");
            \textcolor{c}{return 1;}
+       case ZERROR_INVALID_RADIX:
+           fprintf(stderr, "Radix must be at least 2\verb|\|n");
+           \textcolor{c}{return 1;}
        default:
            zperror("");
            \textcolor{c}{return 1;}
@@ -228,7 +231,7 @@ for reuse.
 If you plan to reuse the variable later, you need to
 reinitialise it by calling {\tt zinit} again.
 
-Alternatives to {\tt zseti} include:
+Alternatives to {\tt zseti} include \psecref{sec:Assignment}:
 
 \begin{alltt}
    void zsetu(z_t a, uint64_t value);
-- 
cgit v1.2.3-70-g09d2

